<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.11" tiledversion="1.11.2" name="vfx_hallucination_ghost_1767620660864" tilewidth="48" tileheight="48" tilecount="441" columns="21">
 <image source="../sprites/vfx/vfx_hallucination_ghost_1767620660864.png" width="1024" height="1024"/>
</tileset>
