﻿<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.0" name="medical_supplies_pack_1766069597213_obj06" tilewidth="42" tileheight="42" tilecount="1" columns="1">
 <image source="../../narezano_loceno/tiled_sprites/medical_supplies_pack_1766069597213_obj06.png" width="42" height="42"/>
</tileset>
