﻿<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.0" name="medical_supplies_pack_1766069597213_obj05" tilewidth="48" tileheight="22" tilecount="1" columns="1">
 <image source="../../narezano_loceno/tiled_sprites/medical_supplies_pack_1766069597213_obj05.png" width="48" height="22"/>
</tileset>
