<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.1" name="medical_supplies_pack_1766069597213 - Object 07" tilewidth="87" tileheight="130" tilecount="1" columns="1">
 <image source="../narezano_loceno/tiled_sprites/medical_supplies_pack_1766069597213_obj07.png" width="87" height="130"/>
</tileset>
