﻿<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.0" name="lab_equipment_pack_1766069518690_obj08" tilewidth="124" tileheight="64" tilecount="1" columns="1">
 <image source="../../narezano_loceno/tiled_sprites/lab_equipment_pack_1766069518690_obj08.png" width="124" height="64"/>
</tileset>
