﻿<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.0" name="lab_equipment_pack_1766069518690_obj03" tilewidth="110" tileheight="116" tilecount="1" columns="1">
 <image source="../../narezano_loceno/tiled_sprites/lab_equipment_pack_1766069518690_obj03.png" width="110" height="116"/>
</tileset>
