<?xml version="1.0" encoding="UTF-8"?>
<tileset version="1.10" tiledversion="1.11.1" name="lab_equipment_pack_1766069518690 - Object 07" tilewidth="120" tileheight="235" tilecount="1" columns="1">
 <image source="../narezano_loceno/tiled_sprites/lab_equipment_pack_1766069518690_obj07.png" width="120" height="235"/>
</tileset>
